{"at_id": "attMKh5WlIdrp32rq", "width": 3500, "height": 2334, "at_size": 133517, "at_type": "image/jpeg", "at_field": "pics", "at_filename": "MSA - bandeja RACK LR lateral izq 091413.jpg", "at_record_id": "recbNruOkCJjo4pqU"}