{"at_id": "att2MMhkil9TEbqtc", "width": 3500, "height": 2334, "at_size": 210579, "at_type": "image/jpeg", "at_field": "pics", "at_filename": "MSA - bandeja RACK LR trasera sin IDC 091504.jpg", "at_record_id": "recbNruOkCJjo4pqU"}